500

500

500

08:30

600

600

700

700

800

900

900

1000

1100

1200

1000

1300

1400

1500

1500

1600

1600

09:00

1700

1300

1400

1500

1800

1800

1600

1700

1900

1700

1800

1800

1900

2000

1900

09:30

2100

2000

2100

2100

2100

1900

1900

1900

1900

1100

1900

1900

1100

1100

1900

1100

1900

1200

1300

1900

1900

1900

1400

Patch Test Line BA (Red) and FE (Cyan)

70˚ 30'W

70˚ 30'W

70˚ 25'W

70˚ 25'W

70˚ 20'W

70˚ 20'W

70˚ 15'W

70˚ 15'W

39˚ 40'N 39˚ 40'N

39˚ 45'N 39˚ 45'N

39˚ 50'N 39˚ 50'N

39˚ 55'N 39˚ 55'N