-800

-700

-700

-700

-600

-500

-500

-400

-400

-400

-400

-400

-300

-300

-300

-300

-300

-200

-200

GMT Oct 1 12:39 yr 2003. Bank 10, NWHI. Mercator projection. 10 m contours. Grid = 50m cells. Map by J.R. Smith, HURL, with able survey assistance by the crew of KoK.

RV Kaimikai-o-Kanaloa SeaBeam survey of Bank 10, NWHI (2003)

178˚ 54' 30"W

178˚ 54' 30"W

178˚ 54' 00"W

178˚ 54' 00"W

178˚ 53' 30"W

178˚ 53' 30"W

178˚ 53' 00"W

178˚ 53' 00"W

178˚ 52' 30"W

178˚ 52' 30"W

28˚ 50' 30"N 28˚ 50' 30"N

28˚ 51' 00"N 28˚ 51' 00"N

28˚ 51' 30"N 28˚ 51' 30"N

28˚ 52' 00"N 28˚ 52' 00"N

0 0.5 1 km

-1200 -1000 -875 -750 -625 -500 -375 -250 -125 0

DEPTH in METERS